0.001 0.01 0.1 1 10 100 1000 10000 10

20

30

40

Ct value

LOD LOQ

0 0.01 0.1 1 10 100 1000 10000

DNA concentration [pg/…l]

LOD LOQ

0

Ae. albopictus Ae. japonicus

0.01 0.1 1 10 100 1000 10000

LOD LOQ

0

Ae. koreicus